)^2c

) (GeV/

-πpΛ

Invariant mass (

2.2 2.21 2.22 2.23 2.24 2.25 2.26 2.27

)^2c

Counts/(2 MeV/

500 1000

1500

2000

2500

3000

3500

ΛΛ pΞ

= 2.76 TeV NNs Pb-Pb (0-10% central)

ALICE